Copyright: EasyImage Lite 1.2.2


EasyImage Lite

EasyImage Lite optimizes photos to make them more suitable for use on the web. It provides a simple user interface that allows you to scale down the file size of images, making them faster to upload, download, and e-mail.

Choose Photo Button

Image Size Selection
Image Quality Selection
Preview Photo Button
Save Photo Button

Registering EasyImage Lite

Licensing Agreement

For more information and support, go to the EasyImage Lite Help Forum.


Choose Photo

The Choose Photo button allows you to select the photo you wish to edit. When you click on the button you will be shown an “Open File” window. Find the file on your computer that you wish to edit, select it and click on “Open.”

Back To Contents


Image Size

The Image Size radio buttons allow you to choose how big you want your photo. There are four possible sizes that you can choose from:

•	Small – This is the smallest setting. It is great for creating thumbnails. (Maximum Dimension: 100px)

•	Medium – This setting is great for larger thumbnails or smaller photo shots. Very useful for large numbers of side by side photos. (Maximum Dimension: 200px)

•	Large – Product shots and e-mail pictures are perfect at this size. Gives a large amount of detail but is still quick to upload and download. (Maximum Dimension: 350px)

•	Huge – The largest of all the settings.  This size is most useful for being downloaded and not placed directly on a web page (such as in a thumbnail gallery.) (Maximum Dimension: 640px)

Back To Contents


Image Quality

The Image Quality radio buttons allow you to change the quality and file size of the photo. There are three possible quality settings that you can choose from:

•	Low – The low quality setting produces the most distortion to the images, but allows for very small file sizes. In many cases, the distortion is small enough not to matter, so this setting should be used whenever possible.

•	Medium – The medium setting gives a combination of quality and size. It will produce slightly larger files than the low setting, but also produces less distortion.

•	High – The high setting gives the best overall image quality, producing almost no distortion. However, this setting also generates the largest file sizes.

Back To Contents


Preview Photo

The Preview Photo button will open up the preview window where you can see the changes you have made to your photo. When the preview window appears, you will see your new image and the pixel dimensions of the new photo. Click on the close button when you are done previewing your changes.

Back To Contents


Save Photo

The Save Photo button allows you to save your optimized photo. When you click on the button you will be shown a “Save File As…” window. The default name for the file will be the same as the name of the file you opened, so you may wish to rename it.  When saving a file, EasyImage Lite will automatically remove any invalid characters from the name of the file.  Refrain from using anything but letters, numbers, underscores (_) and hyphens (-) in your file names.

Back To Contents


Register
Registering EasyImage Lite

EasyImage Lite has a time limited trial period. You may use it for free for 10 days, but after that you must purchase it.  After your 10-day trial, EasyImage Lite will disable the use of the Medium, Large and Huge size settings and the High quality setting.

In order to register EasyImage Lite you will need to go to http://www.chameleon-systems.com and purchase a registration key.  You will then be sent a key by e-mail that will unlock EasyImage Lite.  Simply click on the “Register Now!” link on the bottom of the EasyImage Lite window, enter in the registration key you were sent and click on the Register button. You will now have full use of EasyImage Lite.

Back To Contents


License Agreement

EasyImage Lite

Copyright ©2002 by Chameleon Systems, Inc

All rights reserved.

By using, copying, transmitting, distributing or installing EasyImage Lite, you agree to all of the terms of this License.  If you do not agree to any of the terms of this License, then do not use, copy, transmit, distribute, or install

EasyImage Lite.

This is not free software.  Subject to the terms below, you are hereby licensed by Chameleon Systems, Inc. ("CSI") to use this software for evaluation purposes without charge for a period of 10 days.  If you use this software after the 10 day evaluation period a registration fee of $9.95 (subject to change) is required.  Payments must be in US dollars drawn on a US bank.  See the Chameleon Systems web site at http://www.chameleon-systems.com.  for information about online ordering and price changes.

Unregistered use of EasyImage Lite after the 10-day evaluation period is in violation of U.S. and international copyright laws.

You may, without making any payment to CSI:

1.	give exact copies of this evaluation version of EasyImage Lite personally to anyone, except for the purpose of extending their 10 day evaluation period;

2.	distribute exact copies of this evaluation version of EasyImage Lite, if done exclusively through electronic channels; and

3.	make as many exact copies of this evaluation version of EasyImage Lite as you wish, for purposes of distribution as described in (1) and (2) above

You are specifically prohibited from charging, or requesting donations, for any copies, however made, and from distributing such copies with other products of any kind, commercial or otherwise, without prior written permission from CSI. CSI reserves the right to revoke the above distribution rights at any time, for any or no reason.

This software, and all accompanying files, data and materials, are distributed "AS IS" and with no warranties of any kind, whether express or implied.  Good data processing procedure dictates that any program be thoroughly tested with non-critical data before relying on it.  The user must assume the entire risk of using the program.  This disclaimer of warranty constitutes an essential part of the agreement.  In no event shall CSI, or its principals, shareholders, officers, employees, affiliates, contractors, subsidiaries, or parent organizations, be liable for any incidental, consequential, or punitive damages whatsoever relating to the use of EasyImage Lite, or your relationship with CSI.

In addition, in no event does CSI authorize you to use EasyImage Lite in applications or systems where EasyImage Lite's failure to perform can reasonably be expected to result in a significant physical injury, or in loss of life.  Any such use by you is entirely at your own risk, and you agree to hold CSI harmless from any claims or losses relating to such unauthorized use.

This Agreement is the complete statement of the Agreement between the parties on the subject matter, and merges and supersedes all other or prior understandings, purchase orders, agreements and arrangements. This Agreement shall be governed by the laws of the State of New York.  Exclusive jurisdiction and venue for all matters relating to this Agreement shall be in courts and fora located in the State of New York, and you consent to such jurisdiction and venue.

All rights of any kind in EasyImage Lite which are not expressly granted in this License are entirely and exclusively reserved to and by CSI.  You may not rent, lease, modify, translate, reverse engineer, decompile, disassemble or create derivative works based on EasyImage Lite. You may not make access to EasyImage Lite available to others in connection with a service bureau, application service provider, or similar business, or use EasyImage Lite in a business to provide image resizing services to others. There are no third party beneficiaries of any promises, obligations or representations made by CSI herein.

Copyright ©2002 by Chameleon Systems, Inc All rights reserved.

Back To Contents